Arcturus

Vega

Capella

Altair

Antares

Fomalhaut

Deneb

5 4 3 2 1 0

XEphem Alt/Az Sky View Rochester, New York RA: 20:38:42.0 Declination: 43:08:44 Epoch: 2000.00 Altitude: 90:00:00 Azimuth: 180:00:00 Field Width: 180:00

Julian Date: 2452916.54167 Sidereal Time: 20:38:50 UTC Date: 10/04/2003 UTC Time: 1:00:00

Latitude: 43:09:41 N Longitude: 77:36:21 W

Grid Steps: RA: 2:00:00 Dec: 20:00:00

Created by XEphem Version 3.5.2 8 Jan 2002 Copyright (c) 1990-2002 by Elwood Charles Downey http://www.ClearSkyInstitute.com Generated Fri Oct 3 13:41:03 2003 UTC