NGP

GC

AEq

WS 6 5 4 3 2 1

N W

XEphem Alt/Az Sky View Rochester, New York Center RA: 17:19:13.1 Declination: 43:10:03 Epoch: 2000.00 Altitude: 90:00:00 Azimuth: 180:35:00 Field Width: 180:00

Julian Date: 2454695.53251 Sidereal Time: 17:19:30 UTC Date: 8/17/2008 UTC Time: 0:46:49

Latitude: 43:09:41 N Longitude: 77:36:21 W sky at 8:46 PM

Created by XEphem Version 3.6.3 January 8, 2005 Copyright (c) 1990-2005 by Elwood Charles Downey http://www.xephem.com Generated Sat Aug 16 16:50:52 2008 UTC