F = \frac{GM_{⊙}m}{r^{2}} = \frac{mv^{2}}{r}

v = \sqrt{(\frac{GM_{⊙}}{r} )}

F = \frac{GM_{int} m}{r^{2}} = \frac{mv^{2}}{r}

v(r) = \sqrt{(\frac{GM_{int}}{r} )}

\frac{M_{int}}{r} = Const

G2V \frac{M}{L} = \frac{1 M_{⊙}}{1 L_{⊙}} = 1

B3V \frac{M}{L} = \frac{10 M_{⊙}}{5000 L_{⊙}} = 0.002

M2V \frac{M}{L} = \frac{0.4 M_{⊙}}{0.032 L_{⊙}} = 12.5

Ω_{B}h^{2} ≃ 0.02

Ω_{M} ≃ 0.27