central blob radius θ = 1.22 \frac{λ}{D} radians central blob radius θ = 70 \frac{λ}{D} degrees

θ = v ∗ (Δt) L = 4πR^{2}σT^{4}

R = \sqrt{\frac{L}{4πσT^{4}}}