ΔL L = 1 cm 10 cm

= 0.1 = 10% Δw w = 1 cm 5 cm

= 0.2 = 20%

A = L w = (10 cm) (5 cm) = 50 cm^2 ΔA A = ΔL L + Δw w = 10% + 20% = 30%

ΔA = (A) ( ΔA A ) = (50 cm^2) (30%) = 15 cm^2

A = 50 cm^2 ± 15 cm^2